-- MySql does not support `IF NOT EXISTS` syntax when creating indexes.
-- You should review your database for any of the indexes described here that pre-exist,
-- and omit them from what you apply to your MySql database.

CREATE INDEX IDXusrmtlej61uxhx0yiwpb2rcrv ON blc_notification_state(acked, stopped, notification_name, change_timestamp, next_attempt);
